%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% File: cscpre15.tex
% enthaelt eine Liste der im Jahr 2015 erschienenen Preprints
% als Input-File fuer "sfbreihe.tex",
% diese Liste kann am Ende von neuen Preprints als
% "Eigenwerbung" mit angehaengt werden:
% ...
% \small
% \input{sfbreihe}
% \end{document}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\item[15-01]
M. Weise.
  Simplified calculation of rHCT basis functions for an arbitrary splitting.
  January 2015. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\item[15-02]
M. Weise.
  A note on the second derivatives of rHCT basis functions - extended.
  January 2015. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\item[15-03]
R. Springer, A. Meyer.
  Basics of Linear Thermoelasticity.
  January 2015. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\item[15-04]
R. Schneider, G. Wachsmuth.
  A-posteriori error estimation for control-constrained, linear-quadratic optimal control problems.
  May 2015. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\item[15-05]
N. Lang, J. Saak, T. Stykel.
  Balanced truncation model reduction for linear time-varying systems.
  October 2015. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
